Avoid taking an antacid within 2 hours before or 2 hours after you take Stribild. Some antacids can make it harder for your body to absorb cobicistat, elvitegravir, emtricitabine, and tenofovir.
Using Stribild will not prevent your disease from spreading. Do not have unprotected sex or share razors or toothbrushes. Talk with your doctor about safe ways to prevent HIV transmission during sex. Sharing drug or medicine needles is never safe, even for a healthy person.
