Are there any risks to the test? 
After a blood test, you may have slight pain or bruising at the spot where the needle was put in, but most symptoms go away quickly.
There is very little risk to your baby with a needle stick test. Your baby may feel a little pinch when the heel is poked, and a small bruise may form at the site. This should go away quickly.
